				#
				#
				#
				#
				#
				#
|---------------B A T C H L R N  H E L P  S Y S T E M-----------------|
|command: CTRL C (MS-DOS)  or CTRL-BREAK or  SCR LOCK (PC-DOS)        |
|								      |
|use: To stop a batch file from being processed.                      |
|                                                                     |
|how:Type:CTRL C as batch file is running and it will stop for your   |
| Yes or No confirmation as to discontinuance.                        |
|                                                                     |
|NOTES:When you stop a batch file,the message is:Abort batch job?(Y/N)|
| If you press N for No the task the batch file is performing goes on.|
|                                                                     |
|----------------- T  I  M  E  M  A  S  T  E  R  ---------------------|
